%%%%%
\begin{table}[tbp]
  \begin{center}
    \begin{tabular}{|l@{\slugb}r|}
      \hhline{|--|}
      \multicolumn{2}{|c|}{Input from the SC}\\
      Number of \texttt{.arc.gz} files & 5\\
      Total size of compressed files & 441~MB\\
      Number of documents  & $\sim$\,250~000\\
      \hhline{|--|}
      \multicolumn{2}{|c|}{Output to the CIM}\\
      Number of RDF-XML files & 30\\
      Total size of compressed files & 40~MB\\
      Number of RDF triples & $\sim$\,4~500~000\\
      Number of Providers & $\sim$\,8~700\\
      Number of Services & $\sim$\,25~000\\
      \hhline{|--|}
    \end{tabular}
  \end{center}
  \caption{Typical AA input and output}
  \label{tab:input-output}
\end{table}
%%%%%
